create database gradido_login 
		DEFAULT CHARACTER SET utf8mb4
		DEFAULT COLLATE utf8mb4_unicode_ci;
create database IF NOT EXISTS _skeema_tmp
		DEFAULT CHARACTER SET utf8mb4
		DEFAULT COLLATE utf8mb4_unicode_ci;
FLUSH PRIVILEGES;