#permission=255

// PSEUWOW DEF_SCRIPT STARTUP FILE

LOG * DefScript StartUp [${@version_short}]...

// loads & applies the configuration
CONFIG

// preload the scripts, however its not important to load them now.
//they will get loaded automatically if needed
LOADALL

// load the uptime counter
LOADDEF uptime

// RELOADDEF myscript
// ...

// set permissions for internal functions
INTERNAL_PERM


// do more stuff here in future...

LOG * StartUp complete!


